900

800

700

600

500

400

Y in arcseconds

600 400 200 0 -200 -400 -600 X in arcseconds

1 mas

File:97_070b Number of Residuals: 33 Xrms: 0.000667 Xmax: -0.001395 Yrms: 0.000815 Ymax: 0.001854 rss: 0.000965

900

800

700

600

500

400

Y in arcseconds

600 400 200 0 -200 -400 -600 X in arcseconds

1 mas

File:97_031 Number of Residuals: 34 Xrms: 0.000987 Xmax: 0.002769 Yrms: 0.000932 Ymax: 0.002469 rss: 0.001160

Spring 1997 LTSTAB, pre and post servicing mission 4 prm plate solution

Scale Difference: 1.0259E-05

BMC9703