0 5.0·103 1.0·104 1.5·104 2.0·104 stellar flux (electrons, r=3 pix)

0.00

0.02

0.04

0.06

0.08

0.10 mag loss @ 2048

Low Background (2-4 e) Parallel CTE

1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 log(stellar flux) (electrons, r=3 pix)

-3.0

-2.5

-2.0

-1.5

-1.0 log(mag loss @ 2048 parallel trans)