ETC ID

Your ETC ID is: 2187

S/N and Exposure time:

Exposure time = 106.4 seconds S/N = 10 For point sources only: electron counts in STD aperture = 2.7e+03

The observational parameters for this calculation were:

Detector = 1 Filter = f110w Detector temperature = 61.50 Dark current (e per s per pixel) = 0.00 Telescope thermal background (e per s per pixel) = 0.00 Sky background (e per s per pixel) = 0.03 CDBS DQE multiplied by= 1 Dark current bump: y Saturation in electrons = 145000 Exposure time to saturate = 4.3e+04 Number of Multiple Initial and Final reads: 1 Target was a point source Spectrum: Black body with T = 5000 Source Flux: h = 20 Average Galactic Reddening of E(B-V) = 0.0 The Zodical Light is average

Copyright© 1999 The Association of Universities for Research in Astronomy, Inc. All Rights Reserved.