12 Chapter 2: System Overview

Figure 2.2: The HST Þeld of view with the locations of the SI and the FGS apertures in the (U2,U3) focal plane. The scale in arcsec is indicated.

Figure 2.2 shows the layout of the instrument entrance apertures in the telescope focal plane as projected onto the sky.

Table 2.1 lists the rough effective locations of the SI apertures in the U2,U3 coordinate system. Precise values depend on subtleties in aperture deÞnitions and operational modes. The HST Instrument Handbooks (see Section 1.2) should be consulted for more accurate details of each instrumentÕs aperture locations and characteristics.